   Generation of a sinus function with a frequency of  2.00 Hz.^{Gensys Mplot.9999 Page:1}

Plot_Date: 2020-12-21
Plot_Time:  9.921
                                                                                                           Plotfile:mplotf/sine.mplotf
Mplot_ID:sine

Calc_Date:2020-12-21 Rel.9999

0 .4 .8 1.2 1.6 2 2.4 2.8 3.2 3.6 4 4.4 4.8 5.2

                                                0

                                         .2

                                  .4

                           .6

                     .8

              1

       1.2

1.4 -.2 -.4 -.6 -.8 -1 -1.2 -1.4

time

Line sine: sin2

   Generation of a sinus function with a frequency of  2.00 Hz.^{Gensys Mplot.9999 Page:2}

Plot_Date: 2020-12-21
Plot_Time:  9.921
                                                                                                           Plotfile:mplotf/sine.mplotf
Mplot_ID:sine

Calc_Date:2020-12-21 Rel.9999

0 .4 .8 1.2 1.6 2 2.4 2.8 3.2 3.6 4 4.4 4.8 5.2

                                               0

                                        1

                                  2

                           3

                    4

             5

       6

7 -1 -2 -3 -4 -5 -6 -7

time

Line sine: time

   Generation of a sinus function with a frequency of  2.00 Hz.^{Gensys Mplot.9999 Page:3}

Plot_Date: 2020-12-21

Plot_Time:  9.921

                                                                                                           Plotfile:mplotf/sine.mplotf

Mplot_ID:sine

Calc_Date:2020-12-21 Rel.9999

-1.35 -1.15 -.95 -.75 -.55 -.35 -.15 .05 .25 .45 .65 .85 1.05 1.25

                                                                                                     0
                                                                                             .5
                                                                                       1
                                                                               1.5
                                                                          2
                                                                  2.5
                                                            3
                                                    3.5
                                               4
                                       4.5
                                 5
                         5.5
                    6
            6.5
      7
7.5

sin2

Line sine: time